hDataPlot Entries 23500 Mean 74.59 RMS 17.86

[GeV]

-μ^+μM

0 50 100 150 200 250

Entries/1.0 [GeV]

0

100

200

300

400

500

600

/ndf = 68/57 2χ 0 ± N.Signal= 23500 Expected Signal= 23500 0.00153 ± sigma = 0.11340

Mz OS

0 0 hDataPlot Entries 23500 Mean 74.6 RMS 17.92

[GeV]

-μ^+μM

0 50 100 150 200 250 300 350 400 450

Entries/1.0 [GeV]

-2 10

-1 10

1

10

210

310

/ndf = 68/57 2χ 0 ± N.Signal= 23500 Expected Signal= 23500 0.00153 ± sigma = 0.11340

Mz OS

1 1